<template>
  <div class="components-container" style='height:100vh'>
    <div class='chart-container'>
      <mix-chart id='apple' height='100%' width='100%'></mix-chart>
    </div>
  </div>
</template>

<script>
import mixChart from 'components/Charts/mixChart'

export default {
  components: { mixChart }
}
</script>

<style scoped>
.chart-container{
  position: relative;
  width: 100%;
  height: 90%;
  padding-bottom: 40px;
}
</style>

